!Overview
Overview

++++++++++++++++++++++++++++++++++++++++++++++++++++++++

The USER MANUAL is located at;

$SSW/solarb/eis/planning/ancillary/eis_planning_doc.pdf

++++++++++++++++++++++++++++++++++++++++++++++++++++++++

This tool is used to produce rasters. These are the basic
units of science operations, consisting of a set of 
exposures and a line list (a list of CCD windows to be 
read out).

There are 2 types of raster;
 - SCANNING    - performed at different mirror positions
 - SIT'N'STARE - performed at the same fine mirror 
                 position

!Line List
Line List

Lines may be added, removed and modified by accessing the
"Linelist" menubar items. Line lists may also be loaded
and saved to the lineList database. Other features include
exporting a line list to an ASCII file.

Lines are designated;
     c (core)
     p (project)
     u (user-defined) - may not have the same wavelength
       as any of the project lines

The "Load line list from database" menu item allows you to
search the database and load a previously defined list.

Notes:
 (a) The SWG recommends that all lists include three core
     lines (loaded by default)
 (b) The maximum number of lines allowed in any list is 25
     (hardware limitation)
 (c) When you save a line list in the database a check is
     made to ensure all lines you have defined fall within
     the wavelength range measured by EIS.
 (d) Data-window widths are set in EIS_mk_raster
 (e) Event flags (AEC, Flare, Bright PT etc) are set in 
     EIS_mk_plan


N.B. A maximum of 25 lines may be defined for each raster.

!Slit/slot
Slit/slot

Slit/slot stuff

!Window Height
Window Height

Modify the window height using the slider bar.

The window height must be a multiple of 8 in the range 
8 - 512 pixels.

!Window Width
Window Width

Individual window widths may be edited by using the 
slider bar in the "Selected Line" pane. However, the
widths of all of the windows may be modified simultaneously
by entering the desired value into the "Default width
(pixels)" box and pressing "Set all".

(The window width must be a multiple of 8 in the range
8 - 1024 pixels.)
