!General

    The program SHOW_CDS_TEMP is designed to read the
    CDS temperature log and plot the calibrated data
    for any of the 48 temperature values given in the
    telemetry.

    The CDS temperature log or history is kept in an
    IDL save file:

    $CDS_ENG_DATA/temperature_log

    It is possible to RESTORE this file directly and
    use the structure returned.  The structure is named
    cds_temp_log and has tags .NAME, .TIME and .VALUE.
    The last two are arrays containing the TAI of the
    sample time and the uncalibrated telemetry value.

!Exit

    The exit button will cause the program to exit and
    all the plots to be deleted.  

!Select temperature sensors

    When this button is pressed, a list of all possible
    sensors is presented.  Use the cursor to select any
    parameters you want plotted The 'reset' button will
    reset the selection. The items selected are
    displayed in the main message window.


!Help

    The help button displays this information

!Hard copy ON/OFF

    Use this button to toggle the hardcopy option.  If
    hardcopy is ON, a hardcopy of every plot made on the
    screen will be made and submitted to the default
    printer.

!Replot data

    Allows the user to replot (be careful if the
    Hardcopy option is on!) the selected data. This is
    most useful after the time range has been changed
    using the cursor.


!Select time range using cursor

    After this button is pressed, use the cursor on the
    last displayed plot to select a start and stop
    time.  The data within this time range can be
    replotted by hitting the REPLOT DATA button.


