;  File $CDS_PLAN_TECH/vds_background.def
;
;  Window definitions for VDS background windows. Format (xst,yst,xlen,ylen)
;  Windows should be symmetrical about CCD central axes
;
20  994  10 10
994 994  10 10 
20   20  10 10 
994  20  10 10 
